0 10000 2000030000400005000060000 70000

-23.8

-23.6

-23.4

-23.2

-23

-22.8

-22.6

Mean vs DAC1, FE0 CH0, DAC0=0

0 10000 2000030000400005000060000 70000

76.1

76.2

76.3

76.4

76.5

76.6

76.7

76.8

76.9 77

Mean vs DAC1, FE1 CH0, DAC0=0

0 10000 2000030000400005000060000 70000

189.6

189.8

190

190.2

190.4

190.6

Mean vs DAC1, FE2 CH0, DAC0=0

0 10000 2000030000400005000060000 70000

118.2

118.3

118.4

118.5

118.6

118.7

118.8

118.9 119

119.1

Mean vs DAC1, FE3 CH0, DAC0=0

0 10000 2000030000400005000060000 70000

191.6

191.8 192 192.2

192.4

192.6

192.8 193 193.2

193.4

193.6

Mean vs DAC1, FE4 CH0, DAC0=0

0 10000 2000030000400005000060000 70000

-37.8

-37.6

-37.4

-37.2

-37

-36.8

-36.6

-36.4

Mean vs DAC1, FE5 CH0, DAC0=0

0 10000 2000030000400005000060000 70000

107.5

108

108.5

109

109.5

Mean vs DAC1, FE6 CH0, DAC0=0

0 10000 2000030000400005000060000 70000

98

98.2

98.4

98.6

98.8

99

99.2

99.4

Mean vs DAC1, FE7 CH0, DAC0=0