channel 15

-300 -250 -200 -150 -100 -50 0 50

channel 16

-300

-250

-200

-150

-100

-50

0

50 hist Entries 200 Mean x -111.8 Mean y -157 RMS x 31.69 RMS y 52.86

chip = 2 : enable = 0 : gain = 0 & gain = 1