channel 1

-250 -200 -150 -100 -50 0

channel 2

-250

-200

-150

-100

-50

0 hist4 Entries 200 Mean x -135.4 Mean y -124.8 RMS x 55.8 RMS y 60.76

chip = 2 : enable = 0 : gain = 0 & gain = 1