%\documentclass[11pt,a4paper]{article}
\pdfoutput=1
\documentclass{JINST}
%\usepackage{a4}
%\usepackage{graphicx}


\title{\bf Design and performance of a CMOS study sensor for 
a binary readout electromagnetic calorimeter}
\input authors.tex

\abstract{We present a study of a CMOS test sensor 
which has been designed, fabricated and characterised to
investigate the parameters required for a binary readout
electromagnetic calorimeter.
The sensors were fabricated with several enhancements
in addition to standard CMOS processing.
Detailed simulations and experimental results of the performance 
of the sensor are presented. The sensor and pixels are shown to 
behave in accordance with expectations and the processing enhancements
are found to be essential to achieve the performance required.
}

\keywords{Calorimeter methods,
Detector modelling and simulations,
Solid state detectors}

\begin{document}

\input introduction.tex
\input design.tex
\input simulation.tex
\input testp.tex
\input pixel.tex
\input sensor.tex
\input conclusions.tex
\input acknowledgements.tex
\input references.tex


\end{document}
