\begin{thebibliography}{99}

\bibitem{ref:introduction:ilc}
J.~Brau, Y.~Okada and N.~Walker (eds.),
\emph{International Linear Collider Reference Design Report}, (2007),
\href{http://www.linearcollider.org/rdr}
{\tt http://www.linearcollider.org/rdr}.
%
\bibitem{ref:introduction:calice}
CALICE Collaboration,
\href{https://twiki.cern.ch/twiki/bin/view/CALICE/WebHome}
{\tt https://twiki.cern.ch/twiki/bin/view/CALICE/WebHome}.
%
\bibitem{ref:introduction:prc}
C.~Adloff {\it et al.},
\emph{CALICE Report to the DESY Physics Research Committee}, 
(2011), arXiv:1105.0511.
%
\bibitem{ref:introduction:pfa}
J.-C.~Brient and H.~Videau, 
\emph{The calorimetry at the future e$^+$e$^-$ linear collider},
Proceedings of APS/DPF/DBP summer study on the future of particle physics, 
Snowmass, USA (2002), arXiv:hep-ex/0202004v1;
V.~L.~Morgunov,
\emph{Calorimetry Design with Energy-Flow Concept},
Proceedings of 10th International Conference on Calorimetry
in High Energy Physics (CALOR02), Pasadena, USA (2002);
M.~A.~Thomson, 
\emph{Particle Flow Calorimetry and the PandoraPFA Algorithm},
Nucl.\ Inst.\ Meth.\ {\bf A611} (2009) 25.
%
\bibitem{ref:introduction:decal}
J.~A.~Ballin {\it et al.}, 
\emph{A MAPS-based Digital Electromagnetic Calorimeter for the ILC},
Proceedings of 2007 International Linear Collider Workshop (LCWS07 and
ILC07), Hamburg, Germany (2007), arXiv:0709.1346.
%
\bibitem{ref:introduction:ichep}
P.~D.~Dauncey,
\emph{Performance of CMOS sensors for a digital electromagnetic calorimeter},
Proceedings of the 35th International Conference of High Energy Physics (ICHEP10),
Paris, France (2010),
\href{http://pos.sissa.it/archive/conferences/120/502/ICHEP\%202010_502.pdf}
{\tt http://pos.sissa.it/archive/conferences/120/502/\\
ICHEP\ 202010\_502.pdf}.
%
\bibitem{ref:design:history}
S.~Mendis, S.~E.~Kemeny and E.~R.~Fossum,
\emph{CMOS active pixel image sensor},
\emph{IEEE Trans. Electron Devices}, {\bf 41} (1994) 452;
E.~R.~Fossum, 
\emph{Active Pixel Sensors -- Are CCDs Dinosaurs?},
\emph{CCDs and Optical Sensors III, Proc. SPIE} {\bf 1900} (1993) 2.
%
\bibitem{ref:design:rt3}
R.~Turchetta {\it et al.},
\emph{A monolithic active pixel sensor for charged particle tracking and 
imaging using standard VLSI CMOS technology},
\emph{Nucl. Inst. Meth.} {\bf A458} (2001) 677;
G.~Deptuch {\it et al.}, 
\emph{Simulation and measurements of charge collection in monolithic 
active pixel sensors},
\emph{Nucl. Inst. Meth.} {\bf A465} (2001) 92.
%
\bibitem{ref:design:inmaps}
J.~A.~Ballin {\it et al.}, 
\emph{Monolithic Active Pixel Sensors (MAPS) in a quadruple well 
technology for nearly 100\% fill factor and full CMOS pixels},
\emph{Sensors} {\bf 8} (2008) 5336.
%
\bibitem{ref:design:eldo}
Mentor Graphics Eldo Integrated Circuit Simulation,
\href{http://www.mentor.com/products/ic_nanometer_design/analog-mixed-signal-verification/eldo/}
{\tt http://www.mentor.com/products/ic\_nanometer\_design/\\
analog-mixed-signal-verification/eldo/}.
%
\bibitem{ref:design:spectre}
Cadence Virtuoso Spectre Circuit Simulator,
\href{http://www.cadence.com/products/cic/spectre_circuit/pages/default.aspx}
{\tt http://www.cadence.com/products/cic/spectre\_circuit/pages/default.aspx}.
%
\bibitem{ref:design:sid}
SiD Detector Concept,
\href{http://SiliconDetector.org/}
{\tt http://SiliconDetector.org/}.
%UPDATE TO TDR.
%{\tt http://hep.uchicago.edu/\~oreglia/siddod.pdf}.
%``GLD Detector Outline Document,''
%{\tt http://ilcphys.kek.jp/gld/documents/dod/glddod.pdf};
%``LDC Detector Outline Document,''
%{\tt http://www.ilcldc.org/documents/dod/outline.pdf}.
%
\bibitem{ref:design:ild}
ILD Detector Concept,
\href{http://www.ilcild.org/}
{\tt http://www.ilcild.org/}.
%UPDATE TO TDR.
%
\bibitem{ref:simulation:sentaurus}
Sentaurus TCAD Process and Device Simulation Tools,
\href{http://www.synopsys.com/products/tcad/tcad.html}
{\tt http://www.synopsys.com/products/tcad/tcad.html}.
%
\bibitem{ref:pixel:noise}
A.~Papoulis and S.~U.~Pallai,
\emph{Probability, Random Variables and Stochastic Processes},
Section 11.4, 4$^{th}$ edition, McGraw Hill, 2002.

\end{thebibliography}
