%\documentclass[preprint]{elsarticle}
\documentclass[3p,twocolumn]{elsarticle}
%\usepackage{a4}
%\usepackage{graphicx}

%\oddsidemargin=0pt           % No extra space wasted after first inch.
%\evensidemargin=0pt          % Ditto (for two-sided output).
%\topmargin=0pt               % Same for top of page.
%\headheight=0pt              % Don't waste any space on unused headers.
%\headsep=0pt
%\textwidth=16cm              % Effectively controls the right margin.
%\textheight=24cm



\begin{document}
\title{Performance of a novel sampling electromagnetic calorimeter
with binary readout}

\input authors.tex

\begin{abstract}
We present a study of a novel concept for a sampling 
electromagnetic calorimeter.
Using binary readout with very small pixels, then
an estimate of the number of charged particles
can be made. This is shown to give potentially
better resolution than a more standard analogue readout
of the deposited energy.
The expected
resolution of a full size binary calorimeter is presented,
based on realistic assumptions of detector performance.
\end{abstract}

\begin{keyword}
electromagnetic calorimetry
\PACS 12.34
\end{keyword}

\maketitle

%\newpage
%\tableofcontents
%\newpage
\input introduction.tex
\input basic.tex
\input requirements.tex
\input physics.tex
\input further.tex
\input conclusions.tex
\input acknowledgements.tex
\input references.tex


\end{document}
