\begin{thebibliography}{99}

\bibitem{ref:introduction:ilc}
"International Linear Collider Reference Design Report,'' (2007)\\ 
{\tt http://www.linearcollider.org/rdr}.
%
\bibitem{ref:introduction:ilcphysics1}
"International Linear Collider Reference Design Report
Volume 2: Physics at the ILC,"
ed A.~Djouadi {\it et al.},
(2007) {\tt http://www.linearcollider.org/rdr}.
%
\bibitem{ref:introduction:ilcphysics2}
``TESLA TDR Part III: Physics at an e$^+$e$^-$ Linear Collider,''
ed. R.-D.~Heuer {\it et al.},
DESY 2001-011 (2001).
%
\bibitem{ref:introduction:calice}
CALICE Collaboration,
{\tt http://polywww.in2p3.fr/flc/calice.html}.
NEW WEBSITE?
%
\bibitem{ref:introduction:pfa1}
M.~A.~Thomson, 
``Particle flow calorimetry at the ILC,''
Proceedings of Hadronic Shower Simulations Workshop, Batavia, Illinois (2006),
AIP Conf. Proc. {\bf 896} (2007) 215;
UPDATE?
%
\bibitem{ref:introduction:pfa2}
M.~A.~Thomson, 
``Progress with Particle Flow Calorimetry,''
Proceedings of 2007 International Linear Collider Workshop (LCWS07 and
ILC07), Hamburg, Germany (2007), arXiv:0709.1360.
UPDATE?
%
\bibitem{ref:introduction:pfa3}
J.~E.~Brau {\it et al.}, 
``Calorimetry for the NLC detector,''
Proceedings of the 1996 DPF/DPB Summer Study on New Directions in 
High-energy Physics, Snowmass, Colorado (1996) eConf C960625 DET077.
%
\bibitem{ref:introduction:sid}
SiD Detector Concept,
{\tt http://silicondetector.org/}.
UPDATE TO TDR.
%{\tt http://hep.uchicago.edu/\~oreglia/siddod.pdf}.
%``GLD Detector Outline Document,''
%{\tt http://ilcphys.kek.jp/gld/documents/dod/glddod.pdf};
%``LDC Detector Outline Document,''
%{\tt http://www.ilcldc.org/documents/dod/outline.pdf}.
%
\bibitem{ref:introduction:ild}
ILD Detector Concept,
{\tt http://www.ilcild.org/}.
UPDATE TO TDR.
%
\bibitem{ref:introduction:landau}
Landau shape ref.
%
\bibitem{ref:basic:geant4}
GEANT4 Collaboration, S.~Agostinelli {\it et al.},
Nucl. Inst. Meth. {\bf A506} (2003) 250.
CHECK FOR UPDATE?
%
\bibitem{ref:requirements:guineapig}
Guinea Pig beam simulation,\\
{\tt http://www-sldnt.slac.stanford.edu/nlc/programs/guinea\_pig/gp\_index.html}.
%
%\bibitem{ref:design:rt3}
%G.~Deptuch {\it et al.},
%``Simulation and measurements of charge collection in monolithic 
%active pixel sensors,''
%Nucl. Inst. Meth. {\bf A465} (2001) 92.
%
%\bibitem{ref:design:inmaps}
%J.~A.~Ballin {\it et al.}, 
%``Monolithic Active Pixel Sensors (MAPS) in a quadruple well 
%technology for nearly 100\% fill factor and full CMOS pixels,''
%to be published in Sensors (2008), arXiv:0807.2920.
%
%\bibitem{ref:pixel:noise}
%A.~Papoulis and S.~U.~Pallai,
%``Probability, Random Variables and Stochastic Processes,''
%Section 11.4, 4$^{th}$ edition, McGraw Hill (2002).
%
%\bibitem{ref:pixel:sentaurus}
%Sentaurus TCAD, {\tt http://www.synopsys.com/products/tcad/tcad.html}
%
\bibitem{ref:physics:lcws07}
J.~A.~Ballin {\it et al.}, 
``A MAPS-based Digital Electromagnetic Calorimeter for the ILC,''
Proceedings of 2007 International Linear Collider Workshop (LCWS07 and
ILC07), Hamburg, Germany (2007), arXiv:0709.1346.
%
\bibitem{ref:physics:calice}
CALICE Collaboration, C.~Carloganu {\it et al.},
``Calice Si-W EM Calorimeter: Preliminary Results of the Testbeams 2006,''
Proceedings of 2007 International Linear Collider Workshop (LCWS07 and
ILC07), Hamburg, Germany (2007), arXiv:0709.2516.
%
\bibitem{ref:requirements:ieee}
J.~A.~Ballin {\it et al.},
``Design and performance of a CMOS test sensor for 
a binary readout electromagnetic calorimeter,''
Submitted to IEEE/TNS.
%
\bibitem{ref:physics:inmaps}
J.~A.~Ballin {\it et al.}, 
``Monolithic Active Pixel Sensors (MAPS) in a quadruple well 
technology for nearly 100\% fill factor and full CMOS pixels,''
to be published in Sensors (2008), arXiv:0807.2920. UPDATE.


\end{thebibliography}
