p_SimE Entries 27275 Mean 7.642 RMS 5.817 Underflow 0 Overflow 970 Integral 2.63e+04 / ndf

2χ 290.6 / 206 Constant 16.2±

1528 MPV 0.029 ± 4.482 Sigma 0.018 ± 1.505

(keV) hit E 0 5 10 15 20 25 0

50

100

150

200

250

300

± ±

Energy per hit (in keV)