Layer Index

0 2 4 6 8 10 12

Energy (ADC)

0 200 400 600 800 1000

1200

1400

1600

1800

2000

1 GeV 2 GeV 3 GeV

)_0

(8.3 X o ECAL 30 ^-e

BinWidth: 1e+00